Pixel error                      = [0.3219, 0.2963]
Focal Length                 = (530.69, 531.241)
Principal Point               = (327.5, 245.5)
Skew                              = 0
Radial coefficients         = (-0.3533, 0.1186, 0)
Tangential coefficients  = (0, 0)

                                                                              +/- [1.133, 1.14]
                                                                                     +/- [0, 0]
                                                                                          +/- 0
                                                                      +/- [0.02366, 0.09372, 0]
                                                                                     +/- [0, 0]

       0 100 200 300 400 500 600

    50

   100

   150

   200

   250

   300

   350

   400

   450

10

10

10

10

10

10

20

20

20

20

20

20

30

30

30

30

30

30

40

40

40

40

50

50

50

60

Complete Distortion Model