Pixel error                      = [1.525, 0.9516]
Focal Length                 = (458.415, 473.32)
Principal Point               = (327.5, 245.5)
Skew                              = 0
Radial coefficients         = (0.158, -0.9864, 0)
Tangential coefficients  = (0, 0)

                                                                             +/- [8.935, 11.38]
                                                                                     +/- [0, 0]
                                                                                          +/- 0
                                                                         +/- [0.2918, 1.199, 0]
                                                                                     +/- [0, 0]

       0 100 200 300 400 500 600

    50

   100

   150

   200

   250

   300

   350

   400

   450

20

20

20

20

20

20

40

40

40

40

60

60

60

60

80

80

80

80

100

100

100

120

120

140

Complete Distortion Model