1 4 inbound: stim outbound: non-stim

2 2 inbound: stim outbound: non-stim

3 7

3 11

4 2 inbound: stim outbound: non-stim

4 8 inbound: stim outbound: non-stim inbound: stim outbound: non-stim inbound: stim outbound: non-stim inbound: stim outbound: non-stim

4 22

4 28