0 2 4 6 8 10 0 200 400

Distance spike count/electrode/sec

Multi Units: Count

Distance freq in Hz power spectra of MUA

2 4 6 8 10 5

10

-50 -40 -30

0 2 4 6 8 10 7

7.5 freq at peak pwr

Distance

MUA: Pwr Spectrum

-100

0 pwr

5 10 15 20 0 0.5 1

Frequency

Coherence

MUA - Theta Field coherence/electrode

Distance

MUA-Theta Field coh

2 4 6 8 10 5

10

0.2 0.4 0.6

0 2 4 6 8 10 7

7.5 freq at peak coh

Distance

MUA: Theta Field coh

0

1 coh

Distance phase (in degrees)

2 4 6 8 10

10 20

-100 0 100

2 4 6 8 10

-100 0 100

Distance

Phase (in degrees)

Mean PD b/t 5 and 10 Hz