0 200 400

0 200 0 100 200 R11-S8

0 100 0 100 0 50 100 0 50 100 0 50 100

0 50 0 50

0 200 0 200 0 100 200 0 100 200

0 100 0 100 0 100 0 50 100 0 50 100 0 50

0 100 200 0 100 200 0 100 200 0 100 200 0 100 0 100 0 50 100 0 50 100 0 50 0 50

0 50 100 0 100 0 100 0 100 200

0 100 0 50 100 0 50 0 50 0 50 0

50

0 50 100 0 50 100 0 50 100 0 100 0 100 0 50 100 0 50 100 0 50 100 0 50 0 50

0 50 100 0 50 100 0 50 100 0 100 0 100 200 0 100 200 0 100 200 0 100 0 50 100 0 50 100

0 50 100 0 50 100 0 50 100 0 50 100 0 100 0 100 200

0 100 200 0 100 200 0 50 100 0 50 100

0 50 0 50 0 50 0 50 0 50 0 50 0 50 100 0 100 0 50 0 50

0 50 100 0 50 100

0 50 100

0 50 0 50 100 0 50 100 0 50 100 0 50 100 0 100 0 50 100

0 50 100 0 50 100 0 50 100 0 50 100 0 50 100 0 50 100 0 50 100 0 100 0 100 0 100