2.5 5 30 210

60

240

90

270

120

300

150 330 180 0

FR 0.03

p =0.6

2.5 5 30 210

60

240

90

270

120

300

150 330 180 0

FR 0.11

p =0.12

2.5 5 30 210

60

240

90

270

120

300

150 330 180 0

FR 0.41

p =0.71

10 20 30 210

60

240

90

270

120

300

150 330 180 0

FR 0.55

p =0.31

5 10 30 210

60

240

90

270

120

300

150 330 180 0

FR 0.26

p =0.39