Time

Frequency phase difference at different freq. over time

0 100 200 300 400 500 600 700 800

5

10

15

20

-150

-100 -50 0 50 100 150

Time coherogram

0 100 200 300 400 500 600 700 800

5

10

15

20

0.2 0.4 0.6 0.8