2 4 6 8 10 -50 0 50 100 150

Distance along the LA (mm)

Phase (degrees)

Phase diff. at the Freq of peak theta power as a FOD

2 4 6 8 10 -50

0

50

100 150

Distance along the LA (mm)

Mean PD around the Freq of peak theta power as a FOD

2 4 6 8 10 -50

0

50

100 150

Distance along the LA (mm)

PD at the Freq of peak theta coh. as a FOD

2 4 6 8 10 -50

0

50

100 150

Distance along the LA (mm)

Mean PD around the Freq of peak theta coh. as a FOD