2 4 6 8 10 200 400 600 800 1000

Distance along the LA (mm)

No. of Ripples

Total detected ripples as a FOD

2 4 6 8 10 0 5 10 15

Distance along the LA (mm)

Ripple Rate (/minute)

Ripple-Rate as a FOD

2 4 6 8 10

1000

2000

3000

4000

Distance along the LA (mm)

Ripple Amplitude

Ripple Amplitude as a FOD

2 4 6 8 10 0 100 200 300 400

Distance along the LA (mm)

Slope from regressing local maxima from AAR

Ripple slopes as a FOD

2 4 6 8 10

-800

-600

-400

-200 0

Distance along the LA (mm)

Arbitrary unit

Amplitude diff. b/t 1st & 2nd Local Minima

2 4 6 8 10 0 10 20 30

Distance along the LA (mm) percentage of rips within +/- 5ms of rip on ch1

Co-occurrence of ripples as a FOD