-0.02 0 0.02 0 0.5 1 acg all

-0.2 0 0.2 0 0.5 1

-0.02 0 0.02 0 0.5 1 acg no light

-0.2 0 0.2 0 0.5 1

10 20 30 0 2 4 x 10^5mix

10 20 30 0 2 4 x 10^5no light

10 20 30 0 2 4 x 10^5light

-0.05 00.05 0 10 20 10ms pulse to HPC

0 5 1015 x 10^{-3} 0 2 4 10ms pulse to HPC

2 4 6 2 4 6 8 10

12345 0 1 2 Burst SingleFR

N S N S

1234567891011 0 2 4 state FR

A Q N T R Aa Qa Na Ta Ra

0 0.5 1 1.5 2 2.5 3 x 10^4 0 5 10 0 500 0 5 10

0 500 0 0.5 1

0 500 0 1 2

0 500 0 0.5 1

0 500 0 5 10

-0.4-0.2 00.20.4 0 5 10 DS1 peak

-0.04-0.0200.020.04 0 2 4 DS1 peak

-0.4-0.2 00.20.4 0 10 20 DS2 peak

-0.04-0.0200.020.04 0 2 4 DS2 peak

-200 0 200 0 2 4 REM start all

-200 0 200 0 2 4 REM end all

-200 0 200 0 2 4 REM start

-200 0 200 0 2 4 REM end

0 50 100 0 2 4 TonicStim5V mean

0 50 100 0 10 20 TonicStim5V

0 50 100 0 2 4 TonicStim1.5V mean

0 50 100 0 10 20 TonicStim1.5V

0 0.5 1 090 180270

360450

540630 720

Phase (Â°) lr nonstim

Position

0 0.5 1 090 180270

360450

540630

720 0 0.5 1 090 180270

360450

540630 720 lr tonicstim 1.5V

Position

0 0.5 1 090 180270

360450

540630

720 0 0.5 1 090 180270

360450

540630 720 lr tonicstim 5V

Position

0 0.5 1 090 180270

360450

540630 720

0 0.5 1 090 180270

360450

540630 720 rl nonstim

Position

0 0.5 1 090 180270

360450

540630

720 0 0.5 1 090 180270

360450

540630 720 rl tonicstim 1.5V

Position

0 0.5 1 090 180270

360450

540630 720

Position

0 0.5 1 090 180270

360450

540630 720

YutaMouse20-140325--unit10--shank2--meanFR1.4453--Summary

0 0.5 1 090 180270

360450

540630 720 rl tonicstim 5V