-0.02 0 0.02 0 0.5 1 acg all

-0.2 0 0.2 0 0.5 1

-0.02 0 0.02 0 0.5 1 acg no light

-0.2 0 0.2 0 0.5 1

2 4 6 810 2 4 6 8 10

10 20 30 0 2 4 x 10^5no light

10 20 30 0 2 4 x 10^5light

-0.05 00.05 0 2 4 10ms pulse to HPC

0 5 1015 x 10^{-3} 0 0.5 1 1sec pulse to HPC

0 0.5 1 0 1 2 1sec pulse to HPC

0 500 0 2 4 x 10^{-3} gamma Awake

0 500 0 0.005

0.01 RUN

0 0.5 1 1.5 2 x 10^4 02 46 8