YutaMouse42-151110--DG narrow waveform cell--CA3burstpeakAligned

DG narrow waveform cell

-0.08 -0.06 -0.04 -0.02 0 0.02 0.04 0.06 0.08 0.5

0.6

0.7

0.8

0.9

1

1.1

1.2

1.3

1.4

1.5

0

1

2

3

4

5

6

7