-0.02 0 0.02 acg all

-0.2 0 0.2 -0.02 0 0.02 acg no light

-0.2 0 0.2 10 20 30 no light

10 20 30 light

-0.0500.05 0 5 10 10ms pulse to HPC

0 0.04 0 10 20 1sec pulse to HPC

0 0.5 1 0 100 200 1sec pulse to HPC

0 500 gamma Awake

0 500

× 10^{-3}

0 1 2 RUN

× 10^4

0 0.5 1 1.5 2 2.5 3 3.5 0 2 4 6 0 500

× 10^{-3}

0 1 2 Awake

0 500

× 10^{-3}

0 1 2 REM

0 500

× 10^{-3}

0 1 2

0 500

× 10^{-3}

0 1 2

-200 0 200 0 2 4 REM start

-200 0 200 0 2 4 REM end

A Q N T R Aa Qa Na Ta Ra 0 2 4 state FR

N S N S N S 0 1 2 Burst sFR aFR

-0.4 0 0.4 0 50 100 DS1 peak

-0.04 0 0.04 0 5 10 DS1 peak

-0.4 0 0.4 0 50 100 DS2 peak

-0.04 0 0.04 0 10 20 DS2 peak

0 0.5 1 0 0.5 1 ramp

0 0.5 1 0 0.5 1 sine

10 20 30 40 50

maxFR= 62.5Hz

10 20 30 40 50 0 20 0 5