-0.02 0 0.02 acg all

10 20 30 no light

0 0.5 1 0 50 100 150 1sec pulse to HPC

mazeA

max 5.5 stim mazeB

max 8.8 mazeA

max 12.3

max 6.9 non stim max 10.2 max 16.5