Channel number:18

Time (s)

50

100

Freqs

-1 0 1

Channel number:0

Time (s) 20 40 60 80 100

Freqs

-1 0 1

Channel number:6

Time (s)

50

100

Freqs

-1 0 1

Channel number:61

Time (s) 20 40 60 80 100

Freqs

-1 0 1

Channel number:32

Time (s)

50

100

Freqs

-1 0 1

Channel number:40

Time (s) 20 40 60 80 100

Freqs

-1 0 1

Channel number:57

Time (s)

50

100

Freqs

-1 0 1

Channel number:52

Time (s) 20 40 60 80 100

Freqs

-1 0 1

Channel number:37

Time (s)

50

100

Freqs

-1 0 1