stimBothStem21

100 200 300 400 500 20 40 60 80 100

Freqs baseBothStem21

100 200 300 400 500 600 20 40 60 80 100

Freqs stimBothStem14

100 200 300 400 500 20 40 60 80 100

Freqs baseBothStem14

100 200 300 400 500 600 20 40 60 80 100

Freqs stimBothStem3

100 200 300 400 500 20 40 60 80 100

Freqs baseBothStem3

100 200 300 400 500 600 20 40 60 80 100

Freqs stimBothStem2

100 200 300 400 500 20 40 60 80 100

Freqs baseBothStem2

100 200 300 400 500 600 20 40 60 80 100

Freqs