20 30 40 50 60 dB

5

10

15

20

25

30

Channels

Pyr

Or

Rad

Slm

[5-12Hz] [120-240Hz] [500-1000Hz]

Pyr

Or

Rad

Slm -100 -50 0 50 100 Time [s]

5

10

15

20

25

30

Channels