1 2 0 10 20

Number of ripples

10 15 20 Peak ripple power 0

0.5

1

Proportion

Empirical CDF

Pre Post

0.04 0.06 0.08 Ripple duration 0

0.5

1

Proportion

Analog Ch1

Pre Post

1 2 0

50

Number of ripples

0 100 200 Peak ripple power 0

0.5

1

Proportion

Empirical CDF Pre Post

0.05 0.1 Ripple duration 0

0.5

1

Proportion

Analog Ch2

Pre Post

1 2 0

10

20

Number of ripples

10 15 20 Peak ripple power 0

0.5

1

Proportion

Empirical CDF

Pre Post

0.05 0.1 Ripple duration 0

0.5

1

Proportion

Analog Ch3

Pre Post