1 2 3 4 0 100 200 300 400 500 600

Number of ripples

1000 1500 2000 2500 Peak ripple power 0

1

2

3

Proportion

10^{-3} Ripple power

* prestim pre post poststim

0.02 0.04 0.06 0.08 0.1 Ripple duration 0

20

40

60

Proportion

Ripple duration

prestim pre post poststim

120 140 160 180 Peak ripple frequency 0

0.02

0.04

0.06

Proportion

Ripple frequency

prestim pre post poststim

1 2 3 4 0 100 200 300 400 500 600

Number of ripples

1000 2000 3000 4000 Peak ripple power 0 0.5 1 1.5 2

Proportion

10^{-3} Ripple power

* prestim pre post poststim

0.02 0.04 0.06 0.08 0.1 Ripple duration 0

20

40

60

Proportion

Ripple duration

prestim pre post poststim

120 140 160 180 Peak ripple frequency 0 0.01

0.02

0.03

0.04

0.05

Proportion

Ripple frequency

prestim pre post poststim

1 2 3 4 0 50 100 150 200 250 300

Number of ripples

1000 2000 3000 4000 Peak ripple power 0 0.5 1 1.5 2 2.5

Proportion

10^{-3} Ripple power

* prestim pre post poststim

0.02 0.04 0.06 0.08 0.1 Ripple duration 0 20 40 60 80

Proportion

Ripple duration

prestim pre post poststim

120 140 160 180 Peak ripple frequency 0

0.02

0.04

0.06

Proportion

Ripple frequency

prestim pre post poststim